<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">%***  this is file PHYSUPDT as of 1988.04.06  ***
%***  modifications and updates to PHYS-TeX version 1.0  ***
%
%***  make sure this file is read once and only once !!
%
\ifx\resetpar\undefined
  \wlog{* don't read the file physupdt twice !! *}%
  \expandafter\endinput\fi
\resetpar  % restore definition of \par

\def\fmtupdt{1.3.0}  % identifies the current update version

\wlog{* modifications and updates as of 1988.04.11 *}

\ifx\userid\undefined \def\userid{YOUR~USERID}\fi

\def\wlog#1{} % suppress allocation messages
\catcode`\@=11

%***  physorg  ***

%***  physmain  ***

%***  physfont  ***

%***  load am... or cm... fonts according to PLAIN's selection  ***

%\font\sevensl=\font@sel sl7  %not included in physe (check for TFM first)

%***  sizes  ***

\def\modtwelvepoint{\modtwelve@point
  \let\normal@spacing\twelve@spacing \set@spacing
  \let\big=\modtwelvebig   \let\Big=\modtwelveBig
  \let\bigg=\modtwelvebigg \let\Bigg=\modtwelveBigg}
\def\modtwelvebig#1{{\hbox{$\left#1\vbox to9.5\p@{}\right.\n@space$}}}
\def\modtwelveBig#1{{\hbox{$\left#1\vbox to12.5\p@{}\right.\n@space$}}}
\def\modtwelvebigg#1{{\hbox{$\left#1\vbox to15.5\p@{}\right.\n@space$}}}
\def\modtwelveBigg#1{{\hbox{$\left#1\vbox to18.5\p@{}\right.\n@space$}}}

%***  fonts for sizes  ***

\def\modtwelve@point{\set@fonts twelve nine eight }  %let 8 -&gt;7 if tfm's avail.

%***  macros for sizes  ***

\def\modlarge{\par \bgroup \modtwelvepoint \after@arg\@size}
\def\MODLARGE#1{{\modtwelve@point #1}}

%***  phystext  ***

%***  physpage  ***

%***  physchap  ***

%***  physequ  ***

%***  physstor  ***

%***  physfig  ***

%***  physpict  ***

%***  ProPLOT macros  ***

\outer\def\ProPLOTfigs{\glet\ProPLOTpfig\pr@pfig \glet\ProPLOTlfig\pr@lfig}
\outer\def\noProPLOTfigs{\glet\ProPLOTpfig\nopr@fig \glet\ProPLOTlfig\nopr@fig}

\def\pr@pfig#1#2#3#4{\hbox\bgroup \setbox\z@\hbox{\special{ps: plotfile #1}}
   \dimen\z@=#3 \advance\dimen\z@ by #4 \wd\z@=#2 \ht\z@=\dimen\z@ \dp\z@=\z@
   \lower#4\box\z@ \egroup}
\def\pr@lfig#1#2#3#4{\hbox\bgroup \setbox\z@\null
   \dimen\z@=#3 \advance\dimen\z@ by #4 \wd\z@=#2 \ht\z@=#3 \dp\z@=#4 \box\z@
   \wd\z@=\z@ \setbox\z@\hbox{\special{ps: plotfile #1}} \lower#4\box\z@ \egroup}
%\def\pr@fig#1#2#3#4{\hbox\bgroup \setbox\z@\hbox{\special{ps: plotfile #1}}%
%  \lower#4\copy\z@ \hskip#2\raise#3\box\z@ \egroup}
\def\nopr@fig#1#2#3#4{\hbox\bgroup \write\m@ne{Insert ProPLOT Output File: #1}%
  \frame{#2}{#3}{#4}\egroup}

\ProPLOTfigs %set the default

%***  phystab  ***

%***  phystabl  ***

%***  physref  ***

%***  physjrnl  ***

%***  phystoc  ***

%***  physfoot  ***

%***  physitem  ***

%***  physmath  ***

%***  physsave  ***

\def\save@type{.sav }  % file type for save and restore
                       % modified from .texsave to .sav for PC use
%***  physinst  ***

%***  physorg (options which must be set after defining macros)  ***


\def\wlog{\immediate\write\m@ne} % restore PLAIN's definition
\catcode`\@=12 % @ signs are no longer letters
%***  end of file PHYSUPDT  ***
</pre></body></html>